PRESSURE COOKER

CANNING TIMETABLE FOR NON-ACID VEGETABLES

10 Pounds Steam Pressure

GLASS CONTAINERS

. PINTS

Cals geek Fees oes be a6 eee ere ries 35 minutes ON G5 7G Ga ve oo ow it exe 5 Us Ee oa wed ivaves SS ste MD. NO oss us 0k 5500 a RHEE ORS COUR CAR §5 7 SELES ET OPP EET DOE RE 30 si a i a oe ale ee ia i x Ie] ip Poa os es ae oem ce as 2 ee 40 = re Pee oe Pere eae oY Eee ee ees Pre 30 es Oe eee 35 Ss re Ls a ba Slew bc voce wee wn 30 . Ee ou, SIV ERs We Res aa Oink Eee CO Ss ASE wS 35 £6 ee ee oh se bck Pe Rc RR asa ve 100 r a aoe @ eae bee oy hy wae 6 eer 60 eS Cast awk goes Pha Soha thao * 8 8 rR ate eempige get aaa be eae ars ne pe ME ee 55 . NE GSO CEGW. 645 cu WaWES ode Cr be J i bs BFA OOS + 55 at 15 lbs. ee ae ee ohn ele 85 EEE LIE LE SOE EEN AMET CE ie Fe EO 30 o ae Re Ls iwi a ath hen nina ao a adn + ka 25 a a a a ain hl ew 33 ee Ne ee as ee <acu og kee Oe ea eAW Oa 0 Oa Tb Xe 45 ” CONG is Fig oe hb oo oO Fd ors 0 FORA Eek as sehen 120 ng NN eS a a a bi ais gp ae oii ed os ae 40 " NET ans kate kee VOR 7S re Nee Se ee ea oda b eka se Fie 6 ee a eed gk be aw ews 55 at 15 lbs. a ee ns pak b 4 Reka eo coe eee owas 100 os i ep cobs aeees tude ean eee 35 ag

*—Not recommended.

NOTE: Greens and Spinach take 15 pounds pressure.

QUARTS 40 minutes. 70 i: 70 r 40 ch 40 it 45 7m 40 - 40 a - ee 40 3 be * zi 50 4 70 re 65 at 15 lbs. 105 i oo se oo Y 40 se . ‘ iso ed 50 on 105 i 105 sat

65 at 15 lbs. * or

40

ae

When processing in cookers equipped with thermometers, process according to temperature

instead of pressure.

ALTITUDE CORRECTIONS TO TIMETABLE

Water boils at sea level at 212 degrees Fahrenheit. As the altitude increases, the temperature at which water will boil gradually decreases. The following table gives the temperature at which water boils at different altitudes. It also gives the number of minutes that should be ADDED to the time given in the timetable when processing

in boiling water and with pressure.

Elevation Boiling Extra Feet Above Point of Time in Minutes Sea Level Water F. Boiling Water

500 211 y 1000 210 4 2000 208 © 8 3000 206 12 4000 204 16 5000 202 20 6000 ae 25 7000 199 30

BWWNHOND RH Ke

Extra Lbs. Pressure Added to the Pressure Given

23