S Za FRB

Sp iS ee Fey ee 3 rrr “ort oy ) a : Ne were on UE )

Guarantee

Aristocrat Stainless Steel Utensils are guaranteed to be free from imperfections in material and construction. Any units showing evidence of faulty workmanship or manufacturing defects will be replaced

without charge.

This guarantee does not apply to damage resulting from accident, misuse or abuse.

Manufactured by the Vollrath Company.

HOME OF THE VOLLRATH COMPANY : MANUFACTURERS OF A ARISTOCRAT COOKWARE